Yuengling Premium Light Beer

Yuengling Light maintains a well-balanced character of malt and hops for a crisp, satisfying finish with only 98 calories per serving. Drawing from traditional brewing techniques, our Light Beer is brewed longer to reduce the sugar content and produce fewer calories. Its pale golden color is complemented by a light bodied flavor.

The post Yuengling Premium Light Beer appeared first on WikiliQ®.