Jack’s Abby Smoke & Dagger 1/6 Barrel

Kegs are intended for Kegerator use only. Tap not included.

NOTE: An additional deposit charge per keg may be placed on your card for first time customers only. A representative from Drizly or the store will be in contact to confirm all details prior to delivery.

For special requests, please contact: kegs@drizly.com
—————
How many beers are in a keg?
1/2 Barrel = 15.5 gallons = 165 beers
50 Liter = 13.2 gallons = 140 beers
1/4 Barrel = 7.75 gallons = 82 beers
1/6 Barrel = 5.2 gallons = 55 beers

The post Jack’s Abby Smoke & Dagger 1/6 Barrel appeared first on WikiliQ®.